;
; Definition file of XINPUT1_4.dll
; Automatic generated by gendef
; written by Kai Tietz 2008
;
LIBRARY "XINPUT1_4.dll"
EXPORTS
;DllMain
XInputGetState
XInputSetState
XInputGetCapabilities
XInputEnable
XInputGetBatteryInformation
XInputGetKeystroke
XInputGetAudioDeviceIds
;ord_100 @100
;ord_101 @101
;ord_102 @102
;ord_103 @103
;ord_104 @104
;ord_108 @108
